Date:07/09/2023

U.S. Visa Fee Payment Receipt Number Of Applicants : 1

Appointment Details : Applicant Details Applicant Name Payment Reference Payment Mode

Aamani Adepu

INDG1V8C3L0

Credit Card/Debit Card U.S. Visa fees are non-refundable and non-transferable, this fee can be used for scheduling an appointment within one year from the date of payment.

The U.S. Visa fee receipt may be used to reschedule appointments for a limited number of times.

U.S. Visa fees cannot be transferred to a U.S. Embassy/Consulate outside of the country where the payment was made. In such cases, the applicant will need to purchase a new fee in the country where he/she wishes to apply.

Payment Invoice Transaction Date : 07/09/2023 10:22:27 AM

Transaction ID : 113001350085

Transaction Amount :INR 17220.00

|    |

1