TECHNOLOGY COMPARISON

The  Super  CHI  5000L  is  not  a  “Frequency  Specific  Microcurrent  Device”  or  a

“Hoyland  (Rife)  Machine”  or  a  “Transcutaneous  Electrical  Nerve  SBmulaBon (Tens) Unit” or “Electrical Muscle SBmulaBon (EMS) Unit” or a “Zapper”.   It is far more powerful than any of these as the following comparisons will show:

• Frequency Specific Micro Current Device

As the name indicates, a Frequency Specific Micro Current Device is used to  deliver  micro  current  or  microamperes  into  the  body  at  a  specific frequency.  It depends on frequency to do its work.  The Super CHI 5000L

doesn’t  depend  on  frequency.    It  depends  on  power.    It  can  deliver milliamperes  into  the  body  which  is  a  thousand  Bmes  more  than microamperes.

• Hoyland (Rife) Machine

This  device  depends  on  frequency  just  as  a  Frequency  Specific Microcurrent  Device  depends  on  frequency.    It  has  to  deliver  the resonant  frequency  of  the  target  in  order  to  obtain  the  desired  result because it depends on the resonance OF the target to deliver the power INTO  the  target.    The  most  powerful  plasma  tube  devices  like  the FREQUENCY  PRO  9000  COMPACT,  only  delivers  microamperes  like  the Frequency  Specific  Microcurrent  Device.    It  is  not  powerful  enough  to operate  outside  the  band  of  resonance  like  the  Super  CHI.    The FREQUENCY  PRO  9000  PROFESSIONAL  can  deliver  milliamperes  like  the Super CHI, but it costs 5 Bmes as much and requires programming which the Super CHI does not.

• Transcutaneous  Electrical  Nerve  SEmulaEon  (Tens)  Unit  or  Electrical Muscle  SEmulaEon  (EMS)  Unit    These  devices  only  designed  to STIMULATE  nerves  (Tens)  or  muscles  (EMS).    Because  of  how  they  are used, it would be harmful to the user if they delivered the same power as  the  Super  CHI.

They  only  deliver  microcurrent  like  the

aforemenBoned devices.

• Zapper

This delivers milliampers like the Super CHI 5000L, but it only operates at one  frequency  and  is  approximately  one  tenth  as  powerful  so  it’s  very limited  in  what  it  can  accomplish.    Zappers  are  designed  to  destroy parasites  as  Dr.  Clark  menBons.    The  Super  CHI  operates  with  3

frequencies including a higher frequency than a zapper and adds polarity reversal, so it’s able to do much more than a zapper and do it faster.

• Super CHI 5000L

A Zyto blood scan showed that it eliminated 100% of viruses in addiBon to bacteria that was detected.  TesBmonies show miraculous results from actual users in real life examples, including knocking out a cold or flu in about  10  minutes,  clearing  up  the  sinuses  without  nasal  spray  or decongestants and even more serious condiBons have been resolved as the Super CHI helps the body return to homeostasis.